// Shared data model for both AEVUM directions

const AEVUM_CATEGORIES = [
  { id: 'all',         label: 'All Products',  count: 84 },
  { id: 'filler',      label: 'Filler',        count: 22 },
  { id: 'skinbooster', label: 'Skinbooster',   count: 18 },
  { id: 'body',        label: 'Body Filler',   count: 14 },
  { id: 'hifu',        label: 'HIFU Machines', count: 9  },
  { id: 'devices',     label: 'Devices',       count: 12 },
  { id: 'consumable',  label: 'Consumables',   count: 9  },
];

const AEVUM_PRODUCTS = [
  { id: 'p01', cat: 'hifu',        name: 'OLIGIO',               sub: 'Wontech monopolar RF · Tightening & lifting platform', stock: 'In stock', moq: 1, badge: 'NEW 2026', img: 'assets/oligio.png' },
  { id: 'p02', cat: 'hifu',        name: 'LIFTERA',              sub: 'Dual applicator HIFU · Line + Pen · 4.5mm/4MHz', stock: 'In stock', moq: 1, badge: null, img: 'assets/liftera.png' },
  { id: 'p25', cat: 'hifu',        name: 'SHURINK UNIVERSE',     sub: 'Classys MMFU/HIFU · Booster + Volume + Universe cartridges', stock: 'In stock', moq: 1, badge: null, img: 'assets/shurink-universe.png' },
  { id: 'p18', cat: 'devices',     name: 'HOMETHERA',            sub: 'Home-use HIFU · 4.5mm + 3.0mm cartridges', stock: 'In stock', moq: 1, badge: null, img: 'assets/homethera.png' },
  { id: 'p19', cat: 'devices',     name: '1st LUCENIA',          sub: 'LED + scalp microcurrent dual head device', stock: 'In stock', moq: 1, badge: null, img: 'assets/lucenia.png' },
  { id: 'p05', cat: 'filler',      name: 'AESSOA',               sub: 'HA Filler line · Ultra · Global · Deep · Shine', stock: 'In stock', moq: 12, badge: null, img: 'assets/aessoa.png' },
  { id: 'p13', cat: 'filler',      name: 'JUVÉDERM Vycross',     sub: 'Volbella · Volift · Voluma · Volux · FDA approved', stock: 'In stock', moq: 6, badge: 'FDA', img: 'assets/juvederm.png' },
  { id: 'p14', cat: 'filler',      name: '순수필 Soonsoofill',    sub: 'HA Filler with Lidocaine · 50/100/300/500 · 1.1mL', stock: 'In stock', moq: 12, badge: null, img: 'assets/soonsoofill.png' },
  { id: 'p16', cat: 'filler',      name: 'MINT FILL',            sub: 'Soft · Mild · Hard · Ultra type · 1.0mL', stock: 'In stock', moq: 12, badge: null, img: 'assets/mintfill.png' },
  { id: 'p06', cat: 'skinbooster', name: 'PINKELLA PN',          sub: 'PN biostimulator · 2mL × 2 syringes', stock: 'In stock', moq: 6, badge: 'BESTSELLER', img: 'assets/pinkella.png' },
  { id: 'p07', cat: 'skinbooster', name: 'REJURAN STYLE',        sub: 'PN rejuvenation · 2mL × 2 syringes', stock: 'In stock', moq: 6, badge: null,         img: 'assets/rejuran.png' },
  { id: 'p08', cat: 'skinbooster', name: 'i·NOVA H+L',           sub: 'H-HA + L-HA · Amino & Succinic acid · 2.5mL', stock: 'In stock', moq: 6, badge: 'NEW', img: 'assets/inova.png' },
  { id: 'p09', cat: 'skinbooster', name: 'i·JUV PN',             sub: 'Polynucleotide · 1.1mL pre-filled syringe', stock: 'In stock', moq: 6, badge: null, img: 'assets/ijuv.png' },
  { id: 'p10', cat: 'skinbooster', name: 'eXowell',              sub: 'Hydrolyzed cell infusion · Powder 10mg + Amino 5mL', stock: 'In stock', moq: 6, badge: null, img: 'assets/exowell.png' },
  { id: 'p11', cat: 'skinbooster', name: 'AESPLLA',              sub: 'Poly-L-Lactic Acid powder · 65mg vial · CE 1434', stock: 'In stock', moq: 6, badge: null, img: 'assets/aesplla.png' },
  { id: 'p23', cat: 'skinbooster', name: 'PNAD',                 sub: 'NMN + NAD+ + PN · Anti-aging booster · 3mL', stock: 'In stock', moq: 6, badge: 'NEW', img: 'assets/pnad.png' },
  { id: 'p12', cat: 'body',        name: 'iLEAD 70',             sub: '70mL Body Filler · Vial type', stock: 'In stock', moq: 4, badge: 'NEW', img: 'assets/ilead70.png' },
  { id: 'p15', cat: 'thread',      name: 'PDO Thread',           sub: 'Absorbable PDO suture · Mono/Mono Screw/Double · 25–29G · Undyed', stock: 'In stock', moq: 20, badge: null, img: 'assets/pdo-thread.png' },
  { id: 'p22', cat: 'devices',     name: 'Mark Vu',              sub: 'AI Skin Analyzer · Multi-spectral imaging', stock: 'In stock', moq: 1, badge: null, img: 'assets/markvu.png' },
  { id: 'p20', cat: 'peeling',     name: 'XE`LHA (Peel)',        sub: 'Lipo HydToxy + Capryloyl Salicylic Acid · Peel & Fill · 50mL', stock: 'In stock', moq: 6, badge: null, img: 'assets/xelha-peel.png' },
  { id: 'p21', cat: 'peeling',     name: 'XE`LHA (Y)',           sub: 'Body Peeling Solution · 5mL · All skin types', stock: 'In stock', moq: 12, badge: null, img: 'assets/xelha-y.png' },
  { id: 'p24', cat: 'thread',      name: 'Rainbow Thread',       sub: 'PDO · PCL · PLLA · Absorbable lifting threads · Assorted box', stock: 'In stock', moq: 4, badge: null, img: 'assets/rainbow-thread.png' },
  { id: 'p17', cat: 'consumables', name: 'Everline Premium Cannula', sub: 'Blunt-tip cannula · 22G · 25G · 27G', stock: 'In stock', moq: 24, badge: null, img: 'assets/everline-cannula.png' },
];

const AEVUM_PROCESS = [
  { n: '01', title: 'Send your list',     body: 'Submit a quotation request with the items, quantities, and destination country. One form, no account needed.' },
  { n: '02', title: 'We confirm',         body: 'Our wholesale team replies within 24 hours with availability, MOQ, certifications, and a sealed quote (CIF or EXW).' },
  { n: '03', title: 'Verify & pay',       body: 'You receive lab certificates, batch numbers, and the proforma invoice. Pay 30% deposit by T/T or L/C.' },
  { n: '04', title: 'Cold-chain ship',    body: 'Cold-chain logistics from Incheon. DHL, FedEx, or container freight. Full tracking + shipment dossier.' },
  { n: '05', title: 'Land & restock',     body: 'You receive the goods sealed and certified. Re-orders use a saved buyer profile — no re-quoting needed.' },
];

const AEVUM_CERTS = [
  { code: 'CGMP',  body: 'Korea CGMP certified manufacturing partner' },
  { code: 'ISO',   body: 'ISO 13485 medical device quality management' },
  { code: 'FDA',   body: 'FDA-listed and KFDA approved formulations'  },
  { code: 'CE',    body: 'CE-marked devices for EU import'            },
];

const AEVUM_PRODUCT_DETAIL = {
  id: 'p01',
  name: 'ULTHERA PRIME',
  category: 'HIFU Machine',
  status: 'In stock · Ships from Incheon',
  badge: 'NEW 2026',
  sku: 'AVM-HF-UPR-001',
  moq: '1 unit',
  warranty: '24 months',
  origin: 'Republic of Korea',
  voltage: '110V / 220V (auto)',
  cartridges: ['1.5mm 10MHz', '3.0mm 7MHz', '4.5mm 4MHz', '13mm 2MHz', '6.0mm 2MHz'],
  shots: '20,000 shots / cartridge',
  description:
    'A fourth-generation HIFU platform engineered with a multi-frequency transducer array. Delivers focused thermal coagulation points across SMAS, dermal, and subcutaneous depths — for non-invasive lifting of face and body. Built on a Korean medical-grade chassis with closed-loop temperature monitoring.',
  highlights: [
    'Multi-depth array: 1.5 / 3.0 / 4.5 / 6.0 / 13mm',
    'Real-time skin contact + temperature feedback',
    'Cold-chain delivery + on-site engineer setup',
    'CE / KFDA / CGMP-certified factory',
  ],
};

// Featured products for the hero rotator
const AEVUM_FEATURED = [
  {
    id: 'rejuran',
    name: 'REJURAN STYLE',
    tagline: 'PN rejuvenation skinbooster · 2mL × 2 syringes',
    badge: 'BESTSELLER',
    swatch: '#5B8FB9',
    accent: '#FFFFFF',
    img: 'assets/rejuran.png',
  },
  {
    id: 'oligio',
    name: 'OLIGIO',
    tagline: 'Wontech monopolar RF · Tightening & lifting platform',
    badge: 'NEW · 2026',
    swatch: '#7AAEC9',
    accent: '#FFFFFF',
    img: 'assets/oligio.png',
  },
  {
    id: 'liftera',
    name: 'LIFTERA',
    tagline: 'Dual applicator HIFU · Line + Pen · 4.5mm/4MHz',
    badge: 'IN STOCK',
    swatch: '#9BC4D9',
    accent: '#FFFFFF',
    img: 'assets/liftera.png',
  },
  {
    id: 'ilead70',
    name: 'iLEAD 70',
    tagline: '70mL body filler · Vial type for volume restoration',
    badge: 'NEW',
    swatch: '#6FA8C9',
    accent: '#FFFFFF',
    img: 'assets/ilead70.png',
  },
];

const AEVUM_ACHIEVEMENTS = [
  { value: '420k+',  label: 'Units shipped',     sub: 'Across 2025 — clinics and distributors served worldwide.' },
  { value: '#1',     label: 'Korea-export volume', sub: 'Recognized as a leading K-beauty wholesale partner since 2024.' },
  { value: '38',     label: 'Countries served', sub: 'Distribution into Asia-Pacific, Middle East, Europe, and Latin America.' },
  { value: '11 yrs', label: 'Exporting',        sub: 'Operating from Seoul and Incheon since 2015.' },
];

const AEVUM_SERVICES = [
  { id: 'training',  title: 'CLINICAL TRAINING',     body: 'On-site and online certification for HIFU machines, fillers, and skinboosters. Korean-trained specialists, multi-language support.', img: 'assets/clinical-training.png' },
  { id: 'support',   title: 'TECHNICAL SUPPORT',      body: 'Engineer-level remote diagnostics for devices, on-site repair within the GCC, EU, and SEA partner networks.', img: 'assets/technical-support.png' },
  { id: 'logistics', title: 'COLD-CHAIN LOGISTICS',   body: 'Temperature-monitored shipments out of Incheon, full track-and-trace, customs paperwork prepared per destination.', img: 'assets/cold-chain.png' },
  { id: 'marketing', title: 'CO-MARKETING',           body: 'Clinic launch kits, brand assets, training videos, and event support for wholesale partners.', img: 'assets/co-marketing.png' },
];

const AEVUM_PARTNERS = [
  'CLASSYS', 'JEISYS', 'LG Chem', 'Hugel', 'Medytox', 'Hironic',
  'Daewoong', 'GS Caltex', 'Pacific', 'Donga ST', 'Genoss', 'NewMedical',
];

const AEVUM_TESTIMONIALS = [
  {
    name: 'Dr. Kavita Menon',
    role: 'Aesthetic Director, Mumbai',
    quote: 'AEVUM became our default Korean supplier within a year. The 24-hour quote turnaround and transparent batch documents made due diligence painless.',
  },
  {
    name: 'Mahmoud Tariq',
    role: 'Procurement Lead, Doha',
    quote: 'We compared three Korean wholesalers for HIFU; AEVUM\'s lead time and on-site engineer setup decided it. Two units installed within ten days.',
  },
  {
    name: 'Dr. Lina Sofyan',
    role: 'Clinic Owner, Jakarta',
    quote: 'Their CGMP paperwork is the most complete I have seen from Seoul. Customs cleared on first attempt for every shipment so far.',
  },
  {
    name: 'Sergio Almeida',
    role: 'Distributor, São Paulo',
    quote: 'AEVUM\'s catalogue covers everything we need for face and body in one place. The newest 2026 platforms arrived before any local competitor had them.',
  },
];

window.AEVUM_CATEGORIES = AEVUM_CATEGORIES;
window.AEVUM_PRODUCTS = AEVUM_PRODUCTS;
window.AEVUM_PROCESS = AEVUM_PROCESS;
window.AEVUM_CERTS = AEVUM_CERTS;
window.AEVUM_PRODUCT_DETAIL = AEVUM_PRODUCT_DETAIL;
window.AEVUM_FEATURED = AEVUM_FEATURED;
window.AEVUM_ACHIEVEMENTS = AEVUM_ACHIEVEMENTS;
window.AEVUM_SERVICES = AEVUM_SERVICES;
window.AEVUM_PARTNERS = AEVUM_PARTNERS;
window.AEVUM_TESTIMONIALS = AEVUM_TESTIMONIALS;
